\DocumentMetadata{tagging=on, pdfstandard = ua-2}

\documentclass{ltx-talk}

\title{Frame counters}

\begin{document}

\begin{frame}
  abc
  \pause
  test
\end{frame}

\begin{frame}
  Total frame number: \RefProperty{lastpage}{totalframes}
\end{frame}

\begin{frame}
  abc
\end{frame}

\end{document}
